Abahub 8” SUP Single Center Fin with 1 No Tool Fin Screw, Fiberglass Reinforeced 8 inch SUP Replacement Fins for Surfboard, Stand-up Paddle Board, Longboard, Black/Blue/White(white)

Unique Design: Depth 8 inch, base 5 inch. Designed for a balance of speed, flow and response, suitable for all wave conditions. It's a preferred choice for beginners and expert surfers. The design of curve radian make it maneuverable for you to paddle on the SUP board and better control of direction and speed. This fin fits standard US fin box. Be sure to measure and check the size before purchasing.

Lightweight and Stiff: Made of high-strength fiberglass with honeycomb. The fiberglass conostruction makes the fin stiff and flexible. Ideal for fast, straight shot surfing, offering control, stability, and predictability on your board.

Protective: Come with a soft protective neoprene cover. Protect the fin from dirt, dings and scratches, easy for storage and carrying.

Easy to Install: With the “No-tool” screw, it takes just seconds to insert and remove the fins, you can install the fin on your board only in a few seconds.

Abahub Warranty: we've been manufacturing fins for over 10 years. We know what we're doing and we stand by our products. If you're not happy with our products, we'll offer you replacement or refund with “No Question Asked” warranty.

Abahub 8'' SUP Single Center Fin with 1 No Tool Fin Screw, Fiberglass Reinforeced 8 inch SUP Replacement Fins for Surfboard, Stand-up Paddle Board, Longboard, Black/Blue/White

The post Abahub 8” SUP Single Center Fin with 1 No Tool Fin Screw, Fiberglass Reinforeced 8 inch SUP Replacement Fins for Surfboard, Stand-up Paddle Board, Longboard, Black/Blue/White(white) first appeared on Abahub Direct.